-2

10_{-1}

10_0

10_1

10_2

Spectral ratio

0 25 50 75 100

Frequency (Hz)

Figure T7. Spectral ratios for P waves relative to evid 1. Each curve drawn here corresponds to the median spectral ratio for one shot relative to evid 1 computed from every component of every station that recorded that shot and evid 1.