-4

10_{-3}10_{-3}

10_{-2}

10_{-1}

10_0

10_1

Peak velocity (cm/s)

10_2 10_310_3

Distance (m)

100 line 200 line 300 line

Figure T9. Normalized P wave amplitudes for all data used to estimate the amplitude-distance decay constants. Each measured amplitude was rescaled by the shot-size scaling relation to the reference event size of evid 1 (20 lbs at 20 feet).