Time - Range / 8 (sec)

0 0

10 10

20 20

30 30

40 40

50 50

60 60

78 80

84

86 88 89 90 92 93 94 95

98 99 100

102 104

106 107

112

117

bath-1-1-142-v

chan chan

-150 -100 -50 0 50 100 150 200 Range (km)