Time - Range / 10 (sec)

0 0

50 50

100 100

150 150

200 200

250 250

300 300

121

113

105

97

86

79

71

199

57

216

225

236

245

batholith-1-1-r

chan chan

200 400 600 800 1000 Range (km)