Time - Range / 10 (sec)

0 0

50 50

100 100

150 150

200 200

250 250

300 300

156 164

173 132 125 118 111 103 96 89 82 75 68 60

52

44 36 29

21 5

batholith-2-2a-r

chan chan

200 400 600 800 1000 1200 1400 Range (km)