Time - Range / 10 (sec)

0 0

50 50

100 100

150 150

200 200

250 250

300 300

12 22 37 44 53 61 68 75 83 90 97 104 111 119 127 135 143 150 158 165 173 180 188 196 204 212

batholith-2-2b-v

chan chan

200 400 600 800 1000 1200 1400 1600 1800 Range (km)